MotionCorr/job002/Micrographs/FoilHole_28144823_Data_28143581_28143582_20170301_2207_Fractions_shifts.eps

-1.4 -1.2 -1.0 -0.8 -0.6 -0.4 -0.2 -0.0

-2.5

-2.0

-1.5

-1.0

-0.5

0.0

0.5

X-shift (in pixels)

Y-shift (in pixels)