% $Id: test-pdfmajor.tex 817 2019-11-27 22:44:59Z karl $
% Public domain.
% Leave \pdfmajorversion unset, so it can be set on the command line.
\pdfcompresslevel=0 \pdfobjcompresslevel=0 % get greppable output
\pdfoutput=1
\hrule width1pt height1pt depth0pt
\end
